A1A17A21A5A9A13A25A29A33A37A41A45P3bP1bP1aP3aP5P7P9P11P13P15P17P19P22P21P23P24P4bP2bP2aP4aP6P8P10P12P14P16P18P20P22P21P23P24

A49A53A57A61A65A69A73A81A85A93A97A101

A105

A109

A113

A117

A121

A125

A129

A133

A137

A141

A145

A149

A153

A157

A161

A165

A169

A173

A177

A181

A185

A189

A193

A197

A201

A205

A209

A213

A217

A221

A225

A229

A233

A237

A241

A249

A245

A257

A261

A265

A273

A277

A281-50-142-229-312482163654996187258229089861119

1228

1317

1340

104Beam 01110987122328394413242940451425304146152631424716273243481413293046111098A289

A293

A297

8945A77A897111024402541152631424716273243481223283944132429404514253041461526314247Cryostat window

123456PhiLSEG1

162732434827.06.99

M 1M 2M 3 A1Cal_Gen Number

11ADC Number