A2A18A22A6 A10

A14A26A34A38A46A50A54A58A62A66A70A74A78A82A86A90A94A98A102

A114

A118

A122

A126

A130

A134

A138

A142

A146

A150

A154

A158

A162

A166

A170

A174

A178

A182

A186

A190

A194

A198

A202

A206

A210

A214

A218

A222

A226

A230

A234

A238A242

A250

A246

A258

A262

A266

A274

A278

A282P5aP1P3aP5bP7P9P11P13P15P17P19P22P21P23P3bP6aP2P4aP6bP8P10P12P14P16P18P20P22P21P23P4bLSEG 2

Cryostat window

123456Phi111098723394440454146424743434842474146404513241425152616274814304612A42A30111627101526A106A110914258132471223283944111627324348101526314247925418244032303128293231302924.06.99