P5P7aP9P11P13P15P17P19P22P21P23P7bP6P8bP10P12P14P16P18P20P22P21P23P8aA52A56A60A64A68A72A76A84A88A96A100

A104

A108

A112

A116

A120

A124

A128

A132

A136

A140

A144

A148

A152

A164

A168

A176

A180

A184

A188

A192

A172

A196

A200

A204

A208

A212

A216

A220

A224

A228

A232

A236

A240

A244

A252

A248

A260

A264

A268

A276

A280

A284

A292

A296

A300

P24P24Cryostat window

123456Phi3217203336182134376192235381451A80A92

4172033363619223538A156

A160

251821343717334203642036LSEG 4

24.06.99