0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 50 100 150 200 250 300 350 Total Occupancy, using noise, run 12366 Entries 1159

Mean 0.1065 RMS 0.1413

Total Occupancy, using noise, run 12366 occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

50

100

150

200

250

EMEC Occupancy, using noise, run 12366 Entries 976

Mean 0.1052 RMS 0.1311

EMEC Occupancy, using noise, run 12366 occupancy

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 10 20 30 40 50 60 70 HEC Occupancy, using noise, run 12366 Entries 183

Mean 0.1135 RMS 0.1864

HEC Occupancy, using noise, run 12366