0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

20

40

60

80

100 Total Occupancy, using PedRMS, run 12366 Entries 1159

Mean 0.1977 RMS 0.136

Total Occupancy, using PedRMS, run 12366

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 10 20 30 40 50 60 70 80 90

EMEC Occupancy, using PedRMS, run 12366 Entries 976

Mean 0.2022 RMS 0.1271

EMEC Occupancy, using PedRMS, run 12366

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 2 4 6 8 10 12 14 16

HEC Occupancy, using PedRMS, run 12366 Entries 183

Mean 0.1736 RMS 0.174

HEC Occupancy, using PedRMS, run 12366