beamY_L1

9.6 9.8 10 10.2 10.4 10.6 10.8 11 11.2 11.4 calY_L1

13 13.2

13.4

13.6

13.8 14 14.2

14.4

14.6

14.8 15 Run 12201 e+ 119 GeV Pad D_{h33z}

Entries 3251 Mean x 10.34 Mean y 13.88 RMS x 0.3033 RMS y 0.2761 3 94 0 27 2900 24 16 187 0

EMEC

Run 12201 e+ 119 GeV Pad D beamX_L2

-9 -8.5 -8 -7.5 -7 -6.5 -6 calX_L2

-9

-8.5

-8

-7.5

-7

-6.5

-6 Run 12201 e+ 119 GeV Pad D_{h40z}

Entries 3251 Mean x -7.472 Mean y -7.301 RMS x 0.4324 RMS y 0.4108 0 71 0 7 3131 5 0 37 0

EMEC

Run 12201 e+ 119 GeV Pad D