Testbeam Offline Software Status and Plans

Michel Lefebvre Dugan O’Neil

University of Victoria Victoria, B.C.

July 9, 1998

’

&

            $

            %

Status and Plans

Current Status ffl http://wwwhep.phys.uvic.ca/~uvatlas/hec_adc/hec_adc.html ffl Version 3.4 is the latest release. ffl Improvements since version 3.3

{ new digital filtering package { new maximum adc array treatment { updated manual Future Plans

ffl have received first MC bank for testing. We will add a MC input stream to the code.

ffl analysis of the April 98 testbeam data has lead to imporvements to standard ntuple content. More to come....

ffl patch will be added to take into account 6ns tdc shift at pole-zero adjustment in April (only affects early runs) ffl modify code structure to treat slow control records (and any other record types) ffl online mode will be basically unchanged from April version

July 9, 1998 hec adc-1 ML & DO