Read EPIO data in C++

2001 May 23rd / Meeting at TRIUMP Naoko Kanaya / University of Victoria

To analysis beamtest data in ATHENA framework Step 1 Read beamtest data (EPIO format) in C++ Step 2 Unpack EPIO bank

(pedestal subtraction, fit, calibration....) Step 3 Convert data to TDS

Step 1

Read EPIO data in C++ Make a C++ interface to EPIO functions (FORTRAN).

(see http://home.cern.ch/ blist/c++.)

Wrapper file : epio.h

• The only EPIO functions used in hec adc are wrapped. • Read and convert EPIO data to detector level.

(Compare them with output from FORTRAN program.)

• The code is made for a specific data (’00 Aug.)