0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 0 200 400 600 800 1000

1200

1400

1600

D momentum (D0Kpi)

nominal BF weighted

0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 0

200

400

600

800

1000

1200

D momentum (DchKpipi)

nominal BF weighted