2000

4000

6000

8000

10000

12000

14000

Lepton momentum (D0) OnPeak - OffPeak data BBbar MC

0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2

0

2000

4000

6000

8000

Lepton momentum (D+)

0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 0.6 0.7 0.8 0.9 1 1.1 1.2 1.3 1.4