1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 2000

4000

6000

8000

D mass (D0Kpi) Sig_D0Kpi_{Entries 119390}

Mean 1.864 RMS 0.01086 Underflow 0 Overflow 0

D mass (D0Kpi)