TH1DmissReco

Entries 205733 Mean 1.864 RMS 0.02346 Underflow 0 Overflow 0 Integral 2.057e+05

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

D mass