1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

10

20

30

40

50

D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 2 4 6 8 10 12 14 16 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

2

4

6

8

10 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

20 40

60 80

100

120

D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

10

20

30 40

50 60

D mass Off

1.81 1.811 1.812 1.813 1.814 1.815 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

5

10

15

20

25

30 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

20

40

60

80

100 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

10

20

30

40

50

D mass Off

1.85 1.86 1.87 1.88 1.89 1.9 1.91 1.92 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 D mass Off

1.82 1.84 1.86 1.88 1.9 1.92 0

1

2

3

4

5

6 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

5

10

15

20

25 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 10 20 30 40 50 60 70 80 90 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 5 10 15 20 25 30 35 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

1

2

3

4

5

6 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 10 20 30 40 50 60 70 80 90 D mass Off

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

5

10

15

20

25

D mass Off