1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 500 1000

1500

2000

2500

3000

3500

4000

4500

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

100

200

300

400

500 D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

100

200

300

400

500

600 D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 2000

4000

6000

8000

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 500 1000

1500

2000

2500

3000

3500

4000

D mass

1.82 1.84 1.86 1.88 1.9 -15

-10

-5

0

5

10 D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

2000

4000

6000

8000

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 500 1000

1500

2000

2500

3000

3500

4000

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 -15 -10 -5 0 5

10 15 20 D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94

0

20

40

60

80

100

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 200 400 600 800 1000

1200

1400

1600

1800

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400

D mass

1.855 1.86 1.865 1.87 1.875 1.88 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 D mass

1.82 1.84 1.86 1.88 1.9 1.92 0 1 2 3 4 5 6 7 D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 -20 0 20 40 60 80 100 120 140 160 D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 500 1000

1500

2000

2500

3000

3500

D mass

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 100 200 300 400 500 600 700 800 900 D mass