1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

20

40

60

80

100 310 × peak^{peak}_{Entries 70}

Mean 1.867 RMS 0.0336 Underflow 0 Overflow 0 Integral 3.943e+06

peak