1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 50 100 150 200 250 300 350 400 peak^{peak}_{Entries 70}

Mean 1.861 RMS 0.03449 Underflow 0 Overflow 0 Integral 2.018e+04

peak