0.75 0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 1.25 0 1000

2000

3000

4000

5000

6000

7000

D0star Weight HcorrFF_{Entries 23334}

Mean 0.9987 RMS 0.02341 Underflow 0 Overflow 0 Integral 2.333e+04

D0star Weight