0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 200 400 600 800 1000

1200

1400

1600

D1 Weight HcorrFF_{Entries 53352}

Mean 1.044 RMS 0.239 Underflow 7 Overflow 0 Integral 5.334e+04

D1 Weight