0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 200 400 600 800 1000

1200

1400

D1prime Weight HcorrFF_{Entries 34776}

Mean 1.035 RMS 0.2014 Underflow 104 Overflow 1 Integral 3.467e+04

D1prime Weight