0 0.02 0.04 0.06 0.08 0.1 0.12 0.14 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

D1prime new FF HnewFF_{Entries 34776}

Mean 0.05212 RMS 0.01659 Underflow 322 Overflow 0 Integral 3.445e+04

D1prime new FF