0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 200 400 600 800 1000

1200

1400

1600

1800

D2star old FF HoldFF_{Entries 41914}

Mean 0.386 RMS 0.1144 Underflow 10 Overflow 0 Integral 4.19e+04

D2star old FF