HcorrFF

Entries 530895 Mean 1.008 RMS 0.1302 Underflow 0 Overflow 1046 Integral 5.298e+05

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 5000

10000

15000

20000

25000

30000

35000

40000

HcorrFF