HnewFF

Entries 542313 Mean 0.576 RMS 0.3917 Underflow 0 Overflow 1.142e+04 Integral 5.309e+05

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

2000

4000

6000

8000

10000

HnewFF