0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 2000

4000

6000

8000

10000

12000

Dstar old FF HoldFF_{Entries 542314}

Mean 0.5873 RMS 0.401 Underflow 0 Overflow 52 Integral 5.423e+05

Dstar old FF