ElPID_Eff

Entries 7570504 Mean 1.015 RMS 0.03791 Underflow 0 Overflow 0 Integral 7.571e+06

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

500

1000

1500

2000

2500 310 × ElPID_Eff