ElPID_Fake

Entries 21222 Mean 1.086 RMS 0.348 Underflow 0 Overflow 5089 Integral 1.613e+04

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0

200

400

600

800

1000

1200

ElPID_Fake