ElPID_Fake

Entries 21223 Mean 1.728 RMS 1.454 Underflow 0 Overflow 385 Integral 2.084e+04

0 1 2 3 4 5 6 7 8 9 10 0 500 1000

1500

2000

2500

3000

3500

ElPID_Fake