ElPID_Fake

Entries 21223 Mean 1.404 RMS 0.8254 Underflow 0 Overflow 1895 Integral 1.933e+04

0 0.5 1 1.5 2 2.5 3 3.5 4 0 200 400 600 800 1000

1200

1400

1600

1800

2000

ElPID_Fake