KPID_Eff

Entries 9300740 Mean 1.002 RMS 0.01511 Underflow 0 Overflow 0 Integral 9.301e+06

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 500 1000

1500

2000

2500

3000

3500

4000

4500 310 × KPID_Eff