KPID_Fake

Entries 3300828 Mean 1.186 RMS 0.3012 Underflow 0 Overflow 3.5e+05 Integral 2.951e+06

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 50 100 150 200 250 300 350 310 × KPID_Fake