KPID_Fake

Entries 3300823 Mean 1.343 RMS 0.6005 Underflow 0 Overflow 2415 Integral 3.298e+06

0 1 2 3 4 5 6 7 8 9 10 0 100 200 300 400 500 600 700 800 310 × KPID_Fake