MuPID_Fake

Entries 1178325 Mean 0.9308 RMS 0.3425 Underflow 0 Overflow 1.652e+04 Integral 1.162e+06

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 5000

10000

15000

20000

25000

30000

35000

40000

MuPID_Fake