MuPID_Fake

Entries 1178341 Mean 0.953 RMS 0.3936 Underflow 0 Overflow 785 Integral 1.178e+06

0 0.5 1 1.5 2 2.5 3 3.5 4 0 10000

20000

30000

40000

50000

60000

70000

MuPID_Fake