Trk_Eff

Entries 1.667441e+07 Mean 0.9783 RMS 0.02199 Underflow 0 Overflow 9 Integral 1.667e+07

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 0 1000

2000

3000

4000

5000

6000

7000 310 × Trk_Eff