0 0.5 1 1.5 2 2.5 0 2000

4000

6000

8000

D momentum (D0Kpi)^{Peak_D0Kpi}_{Entries 392339}

Mean 1.245 RMS 0.5448 Underflow 0 Overflow 1.048e+04

D momentum (D0Kpi)

0 0.5 1 1.5 2 2.5 0

2000

4000

6000

8000

D momentum (D0Kpi)^{Side_D0Kpi}_{Entries 238072}

Mean 1.179 RMS 0.5358 Underflow 0 Overflow 3316

D momentum (D0Kpi)

0 0.5 1 1.5 2 2.5 0

1000

2000

3000

4000

5000

6000

7000

D momentum (D0Kpi)^{Sub_D0Kpi}_{Entries 40}

Mean 1.351 RMS 0.5428 Underflow 0 Overflow 0

D momentum (D0Kpi)