0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 0 2000

4000

6000

8000

Lepton momentum (D0Kpi)^{Peak_D0Kpi}_{Entries 347642}

Mean 1.361 RMS 0.3782 Underflow 0 Overflow 1320

Lepton momentum (D0Kpi)

0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 0

2000

4000

6000

8000

Lepton momentum (D0Kpi)^{Side_D0Kpi}_{Entries 211977}

Mean 1.327 RMS 0.3803 Underflow 0 Overflow 1317

Lepton momentum (D0Kpi)

0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 0

1000

2000

3000

4000

5000

6000

Lepton momentum (D0Kpi)^{Sub_D0Kpi}_{Entries 40}

Mean 1.414 RMS 0.3695 Underflow 0 Overflow 0

Lepton momentum (D0Kpi)