-10 -8 -6 -4 -2 0 2 4 0

5000

cosBY (D0Kpi)^{Peak_D0Kpi}_{Entries 364768}

Mean -1.108 RMS 2.81 Underflow 1.867e+04 Overflow 958

cosBY (D0Kpi)

-10 -8 -6 -4 -2 0 2 4

2000

4000

6000

8000

cosBY (D0Kpi)^{Side_D0Kpi}_{Entries 224745}

Mean -1.124 RMS 3.18 Underflow 1.423e+04 Overflow 858

cosBY (D0Kpi)

-10 -8 -6 -4 -2 0 2 4 0 2000

4000

6000

8000

cosBY (D0Kpi)^{Sub_D0Kpi}_{Entries 40}

Mean -1.081 RMS 2.118 Underflow 0 Overflow 0

cosBY (D0Kpi)