10.565 10.57 10.575 10.58 10.585 10.59 10.595 0 10000

20000

30000

40000

50000

60000

70000

80000

90000

Beam energy^{BEngHist}_{Entries 1402234}

Mean 10.58 RMS 0.004842 Underflow 491 Overflow 66 Integral 1.402e+06

Beam energy