10.565 10.57 10.575 10.58 10.585 10.59 10.595 0

1000

2000

3000

4000

5000

Beam energy^{BEngHist}_{Entries 140017}

Mean 10.58 RMS 0.004835 Underflow 48 Overflow 6 Integral 1.4e+05

Beam energy