10.56 10.565 10.57 10.575 10.58 10.585 10.59 10.595 10.6 0 200 400 600 800 1000

1200

1400

1600

1800 310 × sqrtS outHist_{Entries 3838319}

Mean 10.58 RMS 0.0008401 Underflow 0 Overflow 0 Integral 3.838e+06

sqrtS