1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 2000

4000

6000

8000

10000

12000

14000

D0 mass (Kpi, Plep>1.0GeV)

0

OnPeak B+B- B0B0bar OffPeak

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

2000

4000

6000

8000

10000

Dch mass (Kpipi, Plep>1.0GeV)

0

OnPeak B+B- B0B0bar OffPeak