-15 -10 -5 0 5 10 0

200

400

600

800

1000

1200

cosBY (Bp->Dstar0barlp)

0

OnPeak B+B- B0B0bar OffPeak

-15 -10 -5 0 5 10 0

200

400

600

800

1000

1200

cosBY (Bm->Dstar0lm)

0

OnPeak B+B- B0B0bar OffPeak

-15 -10 -5 0 5 10 0

100

200 300

400

500

600 700 cosBY (B0->Dstarmlp)

0

OnPeak B+B- B0B0bar OffPeak

-15 -10 -5 0 5 10 0 100 200 300 400 500 600 700 800 cosBY (B0bar->Dstarplm)

0

OnPeak B+B- B0B0bar OffPeak