1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 500 1000

1500

2000

2500

3000

3500

4000

DMass {DDecayMode==1}^{Entries 145770}_{Mean 1.861}

RMS 0.03042 Underflow 0 Overflow 0

DMass {DDecayMode==1}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

10000

20000

30000

40000

50000

DMass {DDecayMode==2}^{Entries 4423265}_{Mean 1.863}

RMS 0.03378 Underflow 0 Overflow 0

DMass {DDecayMode==2}

1.75 1.8 1.85 1.9 1.95 0 5000

10000

15000

20000

25000

30000

35000

40000

DMass {DDecayMode==3}^{Entries 2805111}_{Mean 1.855}

RMS 0.05504 Underflow 0 Overflow 0

DMass {DDecayMode==3}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 1000

2000

3000

4000

5000

6000

DMass {DDecayMode==4}^{Entries 475477}_{Mean 1.862}

RMS 0.03355 Underflow 0 Overflow 0

DMass {DDecayMode==4}