1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

1000

2000

3000

4000

5000

6000

DMass {DDecayMode==5}^{Entries 241252}_{Mean 1.866}

RMS 0.0316 Underflow 0 Overflow 0

DMass {DDecayMode==5}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

200

400

600

800

1000

1200

DMass {DDecayMode==7}^{Entries 71461}_{Mean 1.866}

RMS 0.03324 Underflow 0 Overflow 0

DMass {DDecayMode==7}

1.75 1.8 1.85 1.9 1.95 0 200 400 600 800 1000

1200

1400

1600 210 × DMass^{Entries 8162336}_{Mean 1.86}

RMS 0.04236 Underflow 0 Overflow 0

DMass