1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

1000

2000

3000

4000

5000

6000

DMass {DDecayMode==1}^{Entries 183443}_{Mean 1.861}

RMS 0.03003 Underflow 0 Overflow 0

DMass {DDecayMode==1}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

10000

20000

30000

40000

50000

DMass {DDecayMode==2}^{Entries 3940510}_{Mean 1.863}

RMS 0.03365 Underflow 0 Overflow 0

DMass {DDecayMode==2}

1.75 1.8 1.85 1.9 1.95 0

10000

20000

30000

40000

50000

DMass {DDecayMode==3}^{Entries 3382281}_{Mean 1.856}

RMS 0.0549 Underflow 0 Overflow 0

DMass {DDecayMode==3}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

1000

2000

3000

4000

5000

6000

DMass {DDecayMode==4}^{Entries 417998}_{Mean 1.862}

RMS 0.03333 Underflow 0 Overflow 0

DMass {DDecayMode==4}