1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 100 200 300 400 500 600 700 800

DMass {(DDecayMode==5)&&(trueDhad==1)}^{Entries 8259}_{Mean 1.869}

RMS 0.01425 Underflow 0 Overflow 0

DMass {(DDecayMode==5)&&(trueDhad==1)}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 10 20 30 40 50 60 70 80 90 DMass {(DDecayMode==7)&&(trueDhad==1)}^{Entries 1014}_{Mean 1.87}

RMS 0.01166 Underflow 0 Overflow 0

DMass {(DDecayMode==7)&&(trueDhad==1)}

1.75 1.8 1.85 1.9 1.95 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

DMass {trueDhad==1}^{Entries 196559}_{Mean 1.862}

RMS 0.02261 Underflow 0 Overflow 0

DMass {trueDhad==1}