1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 100 200 300 400 500 600 700 800 900 DMass {DDecayMode==1}^{Entries 62989}_{Mean 1.863}

RMS 0.03435 Underflow 0 Overflow 0

DMass {DDecayMode==1}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 500 1000

1500

2000

2500

3000

3500

DMass {DDecayMode==2}^{Entries 285509}_{Mean 1.863}

RMS 0.03425 Underflow 0 Overflow 0

DMass {DDecayMode==2}

1.7 1.75 1.8 1.85 1.9 1.95 2 0

1000

2000

3000

4000

5000

DMass {DDecayMode==3}^{Entries 285944}_{Mean 1.858}

RMS 0.0566 Underflow 0 Overflow 0

DMass {DDecayMode==3}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

100

200

300

400

500 DMass {DDecayMode==4}^{Entries 35038}_{Mean 1.862}

RMS 0.03406 Underflow 0 Overflow 0

DMass {DDecayMode==4}