1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0

50

100

150

200

250

DMass {DDecayMode==5}^{Entries 18083}_{Mean 1.867}

RMS 0.03424 Underflow 0 Overflow 0

DMass {DDecayMode==5}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 1.94 0 20 40 60 80 100 120 140 DMass {DDecayMode==7}^{Entries 9219}_{Mean 1.867}

RMS 0.03458 Underflow 0 Overflow 0

DMass {DDecayMode==7}

1.7 1.75 1.8 1.85 1.9 1.95 2 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

DMass^{Entries 696782}_{Mean 1.861}

RMS 0.04489 Underflow 0 Overflow 0

DMass