1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

500

1000

1500

2000

2500

DMass {DDecayMode==1}^{Entries 154310}_{Mean 1.861}

RMS 0.03329 Underflow 0 Overflow 0

DMass {DDecayMode==1}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

5000

10000

15000

20000

25000

DMass {DDecayMode==2}^{Entries 2117873}_{Mean 1.864}

RMS 0.03395 Underflow 0 Overflow 0

DMass {DDecayMode==2}

1.75 1.8 1.85 1.9 1.95 0 5000

10000

15000

20000

25000

30000

35000

40000

DMass {DDecayMode==3}^{Entries 2862318}_{Mean 1.858}

RMS 0.05589 Underflow 0 Overflow 0

DMass {DDecayMode==3}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 500 1000

1500

2000

2500

3000

3500

4000

DMass {DDecayMode==4}^{Entries 295028}_{Mean 1.863}

RMS 0.03388 Underflow 0 Overflow 0

DMass {DDecayMode==4}