1.8 1.82 1.84 1.86 1.88 1.9 1.92 0

100

200

300

400

500

600 DMass {DDecayMode==1}^{Entries 26399}_{Mean 1.861}

RMS 0.03481 Underflow 0 Overflow 0

DMass {DDecayMode==1}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 50 100 150 200 250 300

DMass {DDecayMode==2}^{Entries 22523}_{Mean 1.863}

RMS 0.03459 Underflow 0 Overflow 0

DMass {DDecayMode==2}

1.75 1.8 1.85 1.9 1.95 0 100 200 300 400 500 600 700

DMass {DDecayMode==3}^{Entries 55238}_{Mean 1.861}

RMS 0.05764 Underflow 0 Overflow 0

DMass {DDecayMode==3}

1.8 1.82 1.84 1.86 1.88 1.9 1.92 0 10 20 30 40 50 60 70 80 DMass {DDecayMode==4}^{Entries 3786}_{Mean 1.863}

RMS 0.03392 Underflow 0 Overflow 0

DMass {DDecayMode==4}